-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8

Contours of V

x-Axis ΜcmΝ y-Axis ΜcmΝ