-0.8

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.8

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

Electron drift lines from a track

x-Axis ΜcmΝ y-Axis ΜcmΝ

Gasϑ Ar 90Ψ, CO_2 10Ψ, T=300 K, p=1 atm

Particleϑ e^-, Ekin=3 MeV