(GeV)^2

0 0.2 0.4 0.6 0.8 1 1.2 0 200 400 600 800 1000

1200

1400

1600

1800

h4051 Nent = 94559 Mean = 0.2339 RMS = 0.2015

t dist, [pp] tagged _{h4051}