0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 100 200 300 400 500 600 700 800 900

h4040 Nent = 47134 Mean = 0.701 RMS = 0.255

recoil comparison, [pp] tagged _{h4040}