pi-pi mass

0.2 0.4 0.6 0.8 1 1.2 1.4 0

1000

2000

3000

4000

5000

6000

h4050 Nent = 506446 Mean = 0.69 RMS = 0.2351

Effective Mass (Uncorrected)