momentum transfer (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 0

0.05

0.1

0.15

0.2

Acc_T Nent = 202 Mean = 0.4348 RMS = 0.3539

Acc_t_{Acc_T}