GJ Phi

-3 -2 -1 0 1 2 3 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

Acc_Phi Nent = 152 Mean = -0.07946 RMS = 2.045

Acc_Phi_{Acc_Phi}