ADC channel 0

0 200 400 600 800 1000 1200 1400 1600

ADC channel 1

0 200 400 600 800 1000

1200

1400

1600 hist2

Entries 25912 Mean x 664.1 Mean y 642.3 RMS x 231.5 RMS y 208.4

pulse correlations